Now You Can, with Chronos.

Chronos combines binocular autorefraction and keratometry measurements with binocular subjective testing and visual acuity  in a single instrument.

DELEGATE

GROW

SAVE SPACE

SAVE TIME

CLICK HERE if you are ready  to reinvent refraction.

TOPCON EUROPE MEDICAL B.V.
+ 31-(0)10-4585077 | medical@topcon.com | topconhealthcare.eu | tphc.io/reinventrefraction

Not all products, services or offers are approved or offered in every market, and products vary from one country to another. Contact your local distributor for country-specific information.