New Whitepaper: UV Fact vs. Fiction
Clarifying the Top 10 Myths About UV Devices

UV disinfection devices do not need to be so complicated and confusing.
A new whitepaper from Dr. Ashish Mathur distinguishing the 10 most common Facts from Fiction regarding UV room disinfection technology.
This valuable primer will inform the assessment, selection and successful implementation of UV room disinfection for enhanced Infection Prevention.

UVDI-360 Room Sanitizer
Globally trusted by over 1,100 hospitals

Meet with a UVDI Account Manager to about UV room disinfection
and to see a UVDI-360 Product Demo.

On-Demand CE Webinar Series
Drive Better Patient Outcomes with
UV Room Disinfection:

UV Basics:
Evaluating Performance,
Operation and Safety

Beyond the Basics:
Implementing UV for Better
Patient Outcomes

UV Fact vs. Fiction:
Clarifying the Top
10 UV Myths

uvdi.com