From: Optometry Times <optometrytimes@acimarkets.com> Date: TBD To: Recipient Subject: The DAILIES® Choice Program helps get my patients into a healthy and convenient lens wearing schedule that promotes compliance...

‘

Dr. Crooker was compensated by Alcon for her participation in this advertorial.

The DAILIES® Choice Program helps ensure I get my patients into a healthy and convenient lens replacement schedule that promotes compliance

Jessica Crooker, OD Optometrist Scituate Harbor Vision Source Scituate, MA

When fitting my patients in contact lenses, I always recommend daily disposable lenses first.
•	The DAILIES® Choice Program reflects Alcon’s commitment to increasing patient access to its DAILIES® portfolio of lenses, which include  DAILIES® AquaComfort Plus® offering the widest set of daily disposable parameters readily available to fit nearly every patient.1
•	I use the Alcon DAILIES® Choice Program to  overcome any preconceptions about cost and help ensure I get my patients into a healthy and convenient lens replacement schedule that  promotes replacement compliance.2-6 I transitioned many 2-week and monthly replacement contact  lens wearers into DAILIES TOTAL1® and  DAILIES® AquaComfort Plus® lenses.
Take advantage of this opportunity to help more of your patients become satisfied DAILIES® lens wearers, too!

Check out what switching to  DAILIES TOTAL1®  has meant to James

Learn More about the DAILIES® Choice Program

Prescribing lenses that facilitate compliance with the manufacturer-recommended replacement schedule can mean more frequent annual office visits4

Months Between Office Visits4

14.5

17.4

Patients compliant  with lens replacement recommendations

Patients non-compliant  with lens replacement recommendations

More opportunities to provide comprehensive eye care

Upgrade your weekly and monthly replacement lens wearers to a daily disposable option with the  ALCON DAILIES® CHOICE PROGRAM

Recommend a healthy choice for your patients and practice

Reduce the price barrier for new wearers with high-value savings* on a year’s supply

Give patients a convenient alternative to weekly and monthly replacement lenses

*Savings via mail-in (or online) rebate in the form of an Alcon VISA® pre-paid card. Must be a new wearer to DAILIES TOTAL1® or DAILIES® AquaComfort Plus® lenses and must purchase an annual supply (eight 90-ct boxes) of DAILIES TOTAL1® or DAILIES® AquaComfort Plus® lenses from an eye care professional or participating retailer between 5/1/18 and 8/31/18. An eye exam or lens fitting is required and must occur within 90 days prior to contact lens purchase. Rebate claim must be submitted within sixty (60) days of purchase. Additional restrictions apply. Visit DAILIESCHOICE.com for full Terms and Conditions.

References
1. 	Based on published manufacturer-provided power availability values in: Tyler’s Quarterly Soft Contact Lens Parameter Guide.  March 2018.
2.	Cho P, Boost MV. Daily disposable lenses: The better alternative. Cont Lens Anterior Eye. 2013;36:4-12.
3.	Efron N, Morgan PB, Helland M, et al. Daily disposable contact lens prescribing around the world. Cont Lens Anterior Eye. 2010;33:225-227.
4.	Dumbleton K, Richter D, Bergenske P, Jones LW. Compliance with lens replacement and the interval between eye examinations. Optom Vis Sci. 2013;90:351-358.
5.	Dumbleton K, Woods C, Jones L, et al. Patient and practitioner compliance with silicone hydrogel and daily disposable lens replacement in the United States. Eye Contact Lens. 2009;35:164-171.
6.	Guthrie S, Dumbleton K, Jones L. Financial implications of patient compliance. Contact Lens Spectrum. December 2014;29:42-45.

See product instructions for complete wear, care and safety information.

© 2018 Novartis   8/18       US-DAL-16-E-5026(1)

You received this e-mail because you are a customer of Optometry Times, a UBM publication. You are on the mailing list as jessica.chen@bioscicom.net.
To ensure delivery to your Inbox, please add us to your address book.
From time to time, we will inform customers of latest offers and new products from relevant business partners.  If you do not wish to receive this type of information, click here.
If you would like to contact us by phone, simply call (toll free) 1-866-529-2922 at any time, or fax us at 1-218-740-7223.  Outside the U.S., please phone 1-218-740-6895.
Optometry Times, a UBM publication
131 W. 1st Street
Duluth, MN 55802-2065 USA.
Privacy Policy

From: Paul Farkas, MS, OD, FAAO <paul.farkas@odwire.org> Date: TBD To: Recipient Subject: The DAILIES® Choice Program helps get my patients into a healthy and convenient lens wearing schedule that promotes compliance...

This email was sent to awf@wolfwater.com
why did I get this?    unsubscribe from this list    update subscription preferences
ODwire.org, a service of Proactive Optometric Physicians · 7015 Beracasa Way · Suite 201 · Boca Raton, FL 33431 · USA